<script>
import ProgressBar from "../util/ProgressBar.svelte";
import { formatDataVolume } from "../util/Formatting.svelte"

export let total = 0
export let used = 0

$: frac = used / total
</script>

<ProgressBar total={total} used={used}></ProgressBar>
<div class="gauge_labels">
	<div>
		{formatDataVolume(used, 3)}
	</div>
	<div>
		{#if total <= 0}
			No limit
		{:else}
			{formatDataVolume(total, 3)}
		{/if}
	</div>
</div>

{#if frac > 1}
	<div class="highlight_yellow">
		<p>
			You have used all of your data cap. People can still download your
			files, but premium features are disabled. This means that the
			download page shows pixeldrain branding, people who download your
			files have a daily download limit and hotlinking is disabled.
		</p>

		{#if window.user.monthly_transfer_cap > 0}
			<p>
				You have a billshock limit configured. <a
				href="/user/sharing/bandwidth">increase or disable the limit</a> to
				continue sharing files.
			</p>
		{/if}

		<a class="button button_highlight" href="/#pro">
			<i class="icon">bolt</i> Upgrade options
		</a>
	</div>
{:else if frac > 0.8}
	<div class="highlight_blue">
		<p>
			You have used {(frac*100).toFixed(0)}% of your data cap. If your
			data runs out the premium features related to downloading will be
			disabled. This means that the download page shows pixeldrain
			branding, people who download your files have a daily download limit
			and hotlinking is disabled.
		</p>

		{#if window.user.monthly_transfer_cap > 0}
			<p>
				You have a billshock limit configured. <a
				href="/user/sharing/bandwidth">increase or disable the limit</a> to
				continue sharing files.
			</p>
		{/if}

		<a class="button button_highlight" href="/#pro">
			<i class="icon">bolt</i> Upgrade options
		</a>
	</div>
{/if}

<style>
.gauge_labels {
	display: flex;
	justify-content: space-between;
}
.gauge_labels > div {
	flex: 0 0 auto;
}
</style>
