<script>
import { formatDataVolume } from "../util/Formatting.svelte"
import ProgressBar from "../util/ProgressBar.svelte";

export let total = 0
export let used = 0

$: frac = used / total
</script>

<ProgressBar total={total} used={used}></ProgressBar>

{#if frac > 0.99}
	<div class="highlight_yellow">
		You have used all of your data cap. People can still download your
		files, but advertisements are shown and hotlinking is disabled.
		<br/>
		<a class="button button_highlight" href="https://www.patreon.com/join/pixeldrain">
			Upgrade options
		</a>
	</div>
{:else if frac > 0.8}
	<div class="highlight_blue">
		You have used {(frac*100).toFixed(0)}% of your data cap. If your
		data runs out people won't be able to download your files directly
		from the API anymore, ads will be shown on the file viewer and
		transfer rates will be limited.
		<br/>
		<a class="button button_highlight" href="https://www.patreon.com/join/pixeldrain">
			Upgrade options
		</a>
	</div>
{/if}
